/* Copyright (C) 2019-2022 Free Software Foundation, Inc.

   This file is part of LIBF7, which is part of GCC.

   GCC is free software; you can redistribute it and/or modify it under
   the terms of the GNU General Public License as published by the Free
   Software Foundation; either version 3, or (at your option) any later
   version.

   GCC is distributed in the hope that it will be useful, but WITHOUT ANY
   WARRANTY; without even the implied warranty of MERCHANTABILITY or
   FITNESS FOR A PARTICULAR PURPOSE.  See the GNU General Public License
   for more details.

   Under Section 7 of GPL version 3, you are granted additional
   permissions described in the GCC Runtime Library Exception, version
   3.1, as published by the Free Software Foundation.

   You should have received a copy of the GNU General Public License and
   a copy of the GCC Runtime Library Exception along with this program;
   see the files COPYING3 and COPYING.RUNTIME respectively.  If not, see
   <http://www.gnu.org/licenses/>.  */

static const F7_PGMSPACE f7_t ARRAY_NAME[] =
{
    #define F7_CONST_DEF(NAME, FLAGS, M6, M5, M4, M3, M2, M1, M0, EXPO) \
    { .flags = FLAGS, .mant = { M0, M1, M2, M3, M4, M5, M6 }, .expo = EXPO },
    #include "libf7-const.def"
    #undef F7_CONST_DEF
};

// static const uint8_t n_ARRAY_NAME = <Entries in ARRAY_NAME[]>.

#define F7_n_NAME2(X) n_##X
#define F7_n_NAME1(X) F7_n_NAME2(X)

F7_UNUSED static const uint8_t F7_n_NAME1 (ARRAY_NAME) =
    #define F7_CONST_DEF(NAME, FLAGS, M6, M5, M4, M3, M2, M1, M0, EXPO) \
    + 1
    #include "libf7-const.def"
    #undef F7_CONST_DEF
;

#undef F7_n_NAME1
#undef F7_n_NAME2
