\begin{NumericDataPlot}
   {\textwidth}{6cm}
	\setxAxis
	   {xMin=1, xMax=1.6, Dx=0.2}
	\setyAxis
	   {yMin=50, yMax=150, Dy=25}
	
	\plotxAxis[NoLabel]{}
	\plotyAxis[NoLabel]{}
			
	\NDPhbox[fillstyle=solid,fillcolor = green]%
            {75.0}{100.0}%

	\listplot[style=StdLineStyA] {\IdentI}

	\NDPvbox[fillstyle=solid,fillcolor=red]
            {1.4}{1.5}

    \NDPbox[fillstyle=solid,%
        fillcolor=orange, opacity=0.2, linestyle=none]%
		{1.1}{60}{1.15}{130}
\end{NumericDataPlot}