\input{dcf-submol1}    % load generated submolecules ...
\input{ce-submol1} 

\chemfig{              % and stitch them together
          {\color{red}C}
           (=[:45]O)
           (-[:180,6]!{dcf1})
   -[:-90]!{ce1}
}
